Unexpected NEXT Program Error Program Syntax Error          Unexepected RETURN Statement  Program DATA Statement Error  Improper Argument Error       Number Is Too Large           The Memory Is Full            Program Line Missing Error    Variable Is Out Of Range      Program Array Dimension Error Division By Zero Has Occurred Invalid Program Command       Program Type Mismatch Error   The PCW's Memory Is Full      Program String Is Too Long    Program Expression Error      I Can't CONTinue!. Re-RUN     Unkown User Function. Re-RUN  Program RESUME Is Missing     Program Unexpected RESUME     Unknown CP/M Program Error    Program Operand Missing       Program Line Is Too Long      Unknown Error                 Unknown Error                 Program NEXT Is Missing       Unknown Error                 Unknown Error                 Program WEND Is Missing       Program Unexpected WEND       Error 31=Unknown Error        Error 32=Unknown Error        Error 33=Unknown Error        Error 34=Unknown Error        Error 35=Unknown Error        Error 36=Unknown Error        Error 37=Unknown Error        Error 38=Unknown Error        Error 39=Unknown Error        Error 40=Unknown Error        Error 41=Unknown Error        Error 42=Unknown Error        Error 43=Unknown Error        Error 44=Unknown Error        Error 45=Unknown Error        Error 46=Unknown Error        Error 47=Unknown Error        Error 48=Unknown Error        Error 49=Unknown Error        Program Record Overflow       Computer Internal Error       Program File Number Error     File Not Found!               Wrong Type Of File!           The File Is Already Open      Error 56=Unknown Error        I Can't Open The File!        The File Already Exists!      Error 59=Unknown Error        Error 60=Unknown Error        Disc Full or Disc Error!      Disc Changed or End Of File!  Program Record Number Error   Invalid CP/M Filename!        Error 65=Unknown Error        Direct Program Command Found  Missing/Damaged/Full Disc!    Disc Changed Or End Of File!  The Record Is Locked!         The Disc Is 'Read Only'!      The File Is Already Open!     Invalid CP/M Drive Letter!    The File Is Locked!           I Can't Reset The Disc Drive! Error 75=Unknown Error        Error 76=Unknown Error        Error 77=Unknown Error        Error 78=Unknown Error        Error 79=Unknown Error        Missing Program Overlay!      Error 81=Unknown Error        Error 82=Unknown Error        Error 83=Unknown Error        Error 84=Unknown Error        Error 85=Unknown Error        Error 86=Unknown Error        Error 87=Unknown Error        Error 88=Unknown Error        Error 89=Unknown Error        * Program Is A Pirate Copy! * Error 91=Unknown Error        Error 92=Unknown Error        Error 93=Unknown Error        Error 94=Unknown Error        Error 95=Unknown Error        Error 96=Unknown Error        Error 97=Unknown Error        Error 98=Unknown Error        Error 99=Unknown Error        Error 100=Unknown Error       Error 101=Unknown Error       Error 102=Unknown Error       Error 103=Unknown Error       Error 104=Unknown Error       Error 105=Unknown Error       Error 106=Unknown Error       Error 107=Unknown Error       Error 108=Unknown Error       Error 109=Unknown Error       Error 110=Unknown Error       Error 111=Unknown Error       Error 112=Unknown Error       This Is Not A Keyed File!     The Record Is Not Locked!     Damaged Index (KEY) File!     